\begin{table}[b]
  \scriptsize
  \renewcommand{\tabcolsep}{0.09cm}
  \centering
%  \captionof{table}{Model Parameters}
  \begin{tabularx}{0.5\textwidth}{ccccc} \\
    \toprule \\
    Model &
    $\mpns\left[\msun\right]$ &
    $\rpns\left[\km\right]$ &
    $\rsh\left[\km\right]$ &
    $\xi$ \\ \\
    \midrule \\
    \texttt{M1.4\_Rpns070\_Rsh1.50e2} & 1.4 & 70 & 150 & 0.4 \\
    \texttt{M1.4\_Rpns040\_Rsh1.20e2} & 1.4 & 40 & 120 & 0.7 \\
    \texttt{M1.4\_Rpns040\_Rsh1.50e2} & 1.4 & 40 & 150 & 0.7 \\
    \texttt{M1.4\_Rpns040\_Rsh1.75e2} & 1.4 & 40 & 175 & 0.7 \\
    \texttt{M1.8\_Rpns020\_Rsh7.00e1} & 1.8 & 20 &  70 & 1.8 \\
    \texttt{M2.8\_Rpns020\_Rsh6.00e1} & 2.8 & 20 &  60 & 2.8 \\
    \texttt{M2.8\_Rpns020\_Rsh7.00e1} & 2.8 & 20 &  70 & 2.8 \\
    \bottomrule \\
  \end{tabularx}
  %\caption*{Model parameters chosen for the \nModels{} models.
  \caption{Model parameters chosen for the \nModels{} models.
  All models were run with both GR and NR.
  \repl{The first three rows correspond to the low-compactness models and the
  last two rows correspond to the high-compactness models.}{}}
  \label{tab.modelParameters}
\end{table}

